From 45332006a3da246679e6043b4abee06cd3ba0636 Mon Sep 17 00:00:00 2001
From: Maximilian Hils <git@maximilianhils.com>
Date: Wed, 23 Nov 2016 22:35:07 +0100
Subject: mitmweb: 100% app test coverage, numerous fixes

---
 web/src/js/components/Header/OptionMenu.jsx | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'web/src/js/components/Header/OptionMenu.jsx')

diff --git a/web/src/js/components/Header/OptionMenu.jsx b/web/src/js/components/Header/OptionMenu.jsx
index a11062f2..186a9c6a 100644
--- a/web/src/js/components/Header/OptionMenu.jsx
+++ b/web/src/js/components/Header/OptionMenu.jsx
@@ -49,11 +49,11 @@ function OptionMenu({ settings, updateSettings }) {
                     txt={settings.stickycookie}
                     onToggleChanged={txt => updateSettings({ stickycookie: !settings.stickycookie ? txt : null })}
                 />
-                <ToggleInputButton name="stream" placeholder="stream..."
-                    checked={!!settings.stream}
-                    txt={settings.stream}
+                <ToggleInputButton name="stream_large_bodies" placeholder="stream..."
+                    checked={!!settings.stream_large_bodies}
+                    txt={settings.stream_large_bodies}
                     inputType="number"
-                    onToggleChanged={txt => updateSettings({ stream: !settings.stream ? txt : null })}
+                    onToggleChanged={txt => updateSettings({ stream_large_bodies: !settings.stream_large_bodies ? txt : null })}
                 />
             </div>
             <div className="clearfix"/>
-- 
cgit v1.2.3

