From d2475e6a146534b5e7aaf2cc7b0b9a75e418415e Mon Sep 17 00:00:00 2001
From: Maximilian Hils <git@maximilianhils.com>
Date: Sat, 13 Sep 2014 23:05:12 +0200
Subject: web: start gui

---
 web/src/js/certinstall.jsx | 27 ---------------------------
 1 file changed, 27 deletions(-)
 delete mode 100644 web/src/js/certinstall.jsx

(limited to 'web/src/js/certinstall.jsx')

diff --git a/web/src/js/certinstall.jsx b/web/src/js/certinstall.jsx
deleted file mode 100644
index 2e681ac2..00000000
--- a/web/src/js/certinstall.jsx
+++ /dev/null
@@ -1,27 +0,0 @@
-/** @jsx React.DOM */
-
-var CertInstallView = React.createClass({
-    render: function () {
-        return <div className="certinstall">
-            <h2> Click to install the mitmproxy certificate: </h2>
-            <div id="certbank" className="row">
-                <div className="col-md-3">
-                    <a href="/cert/pem"><i className="fa fa-apple fa-5x"></i></a>
-                    <p>Apple</p>
-                </div>
-                <div className="col-md-3">
-                    <a href="/cert/p12"><i className="fa fa-windows fa-5x"></i></a>
-                    <p>Windows</p>
-                </div>
-                <div className="col-md-3">
-                    <a href="/cert/pem"><i className="fa fa-android fa-5x"></i></a>
-                    <p>Android</p>
-                </div>
-                <div className="col-md-3">
-                    <a href="/cert/pem"><i className="fa fa-asterisk fa-5x"></i></a>
-                    <p>Other</p>
-                </div>
-            </div>
-        </div>;
-    }
-});
-- 
cgit v1.2.3

