From 9723930be303aa29fadf159a6e3a7b2299bae0e9 Mon Sep 17 00:00:00 2001
From: Felix Fietkau <nbd@openwrt.org>
Date: Thu, 20 Dec 2012 15:29:33 +0000
Subject: docs: update remaining references to functions.sh

SVN-Revision: 34803
---
 docs/config.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/config.tex')

diff --git a/docs/config.tex b/docs/config.tex
index 17417c99a1..08318b4b6c 100644
--- a/docs/config.tex
+++ b/docs/config.tex
@@ -23,7 +23,7 @@ To be able to load configuration files, you need to include the common
 functions with:
 
 \begin{Verbatim}
-. /etc/functions.sh
+. /lib/functions.sh
 \end{Verbatim}
 
 Then you can use \texttt{config\_load \textit{<name>}} to load config files. The function
@@ -32,7 +32,7 @@ it from \texttt{/etc/config} (which is the most common way of using it).
 
 If you want to use special callbacks for sections and/or options, you
 need to define the following shell functions before running \texttt{config\_load}
-(after including \texttt{/etc/functions.sh}):
+(after including \texttt{/lib/functions.sh}):
 
 \begin{Verbatim}
 config_cb() {
-- 
cgit v1.2.3

