/*
             LUFA Library
     Copyright (C) Dean Camera, 2017.

  dean [at] fourwalledcubicle [dot] com
           www.lufa-lib.org
*/

/*
  Copyright 2017  Dean Camera (dean [at] fourwalledcubicle [dot] com)

  Permission to use, copy, modify, distribute, and sell this
  software and its documentation for any purpose is hereby granted
  without fee, provided that the above copyright notice appear in
  all copies and that both that the copyright notice and this
  permission notice and warranty disclaimer appear in supporting
  documentation, and that the name of the author not be used in
  advertising or publicity pertaining to distribution of the
  software without specific, written prior permission.

  The author disclaims all warranties with regard to this
  software, including all implied warranties of merchantability
  and fitness.  In no event shall the author be liable for any
  special, indirect or consequential damages or any damages
  whatsoever resulting from loss of use, data or profits, whether
  in an action of contract, negligence or other tortious action,
  arising out of or in connection with the use or performance of
  this software.
*/

/** \file
 *
 *  Main source file for the MIDI demo. This file contains the main tasks of
 *  the demo and is responsible for the initial application hardware configuration.
 */

#include "MIDI.h"

/** LUFA MIDI Class driver interface configuration and state information. This structure is
 *  passed to all MIDI Class driver functions, so that multiple instances of the same class
 *  within a device can be differentiated from one another.
 */
USB_ClassInfo_MIDI_Device_t Keyboard_MIDI_Interface =
	{
		.Config =
			{
				.StreamingInterfaceNumber = INTERFACE_ID_AudioStream,
				.DataINEndpoint           =
					{
						.Address          = MIDI_STREAM_IN_EPADDR,
						.Size             = MIDI_STREAM_EPSIZE,
						.Banks            = 1,
					},
				.DataOUTEndpoint          =
					{
						.Address          = MIDI_STREAM_OUT_EPADDR,
						.Size             = MIDI_STREAM_EPSIZE,
						.Banks            = 1,
					},
			},
	};


/** Main program entry point. This routine contains the overall program flow, including initial
 *  setup of all components and the main program loop.
 */
int main(void)
{
	SetupHardware();

	LEDs_SetAllLEDs(LEDMASK_USB_NOTREADY);
	GlobalInterruptEnable();

	for (;;)
	{
		CheckJoystickMovement();

		MIDI_EventPacket_t ReceivedMIDIEvent;
		while (MIDI_Device_ReceiveEventPacket(&Keyboard_MIDI_Interface, &ReceivedMIDIEvent))
		{
			if ((ReceivedMIDIEvent.Event == MIDI_EVENT(0, MIDI_COMMAND_NOTE_ON)) && (ReceivedMIDIEvent.Data3 > 0))
			  LEDs_SetAllLEDs(ReceivedMIDIEvent.Data2 > 64 ? LEDS_LED1 : LEDS_LED2);
			else
			  LEDs_SetAllLEDs(LEDS_NO_LEDS);
		}

		MIDI_Device_USBTask(&Keyboard_MIDI_Interface);
		USB_USBTask();
	}
}

/** Configures the board hardware and chip peripherals for the demo's functionality. */
void SetupHardware(void)
{
#if (ARCH == ARCH_AVR8)
	/* Disable watchdog if enabled by bootloader/fuses */
	MCUSR &= ~(1 << WDRF);
	wdt_disable();

	/* Disable clock division */
	clock_prescale_set(clock_div_1);
#elif (ARCH == ARCH_XMEGA)
	/* Start the PLL to multiply the 2MHz RC oscillator to 32MHz and switch the CPU core to run from it */
	XMEGACLK_StartPLL(CLOCK_SRC_INT_RC2MHZ, 2000000, F_CPU);
	XMEGACLK_SetCPUClockSource(CLOCK_SRC_PLL);

	/* Start the 32MHz internal RC oscillator and start the DFLL to increase it to 48MHz using the USB SOF as a reference */
	XMEGACLK_StartInternalOscillator(CLOCK_SRC_INT_RC32MHZ);
	XMEGACLK_StartDFLL(CLOCK_SRC_INT_RC32MHZ, DFLL_REF_INT_USBSOF, F_USB);

	PMIC.CTRL = PMIC_LOLVLEN_bm | PMIC_MEDLVLEN_bm | PMIC_HILVLEN_bm;
#endif

	/* Hardware Initialization */
	Joystick_Init();
	LEDs_Init();
	Buttons_Init();
	USB_Init();
}

/** Checks for changes in the position of the board joystick, sending MIDI events to the host upon each change. */
void CheckJoystickMovement(void)
{
	static uint8_t PrevJoystickStatus;

	uint8_t MIDICommand = 0;
	uint8_t MIDIPitch;

	/* Get current joystick mask, XOR with previous to detect joystick changes */
	uint8_t JoystickStatus  = Joystick_GetStatus();
	uint8_t JoystickChanges = (JoystickStatus ^ PrevJoystickStatus);

	/* Get board button status - if pressed use channel 10 (percussion), otherwise use channel 1 */
	uint8_t Channel = ((Buttons_GetStatus() & BUTTONS_BUTTON1) ? MIDI_CHANNEL(10) : MIDI_CHANNEL(1));

	if (JoystickChanges & JOY_LEFT)
	{
		MIDICommand = ((JoystickStatus & JOY_LEFT)? MIDI_COMMAND_NOTE_ON : MIDI_COMMAND_NOTE_OFF);
		MIDIPitch   = 0x3C;
	}

	if (JoystickChanges & JOY_UP)
	{
		MIDICommand = ((JoystickStatus & JOY_UP)? MIDI_COMMAND_NOTE_ON : MIDI_COMMAND_NOTE_OFF);
		MIDIPitch   = 0x3D;
	}

	if (JoystickChanges & JOY_RIGHT)
	{
		MIDICommand = ((JoystickStatus & JOY_RIGHT)? MIDI_COMMAND_NOTE_ON : MIDI_COMMAND_NOTE_OFF);
		MIDIPitch   = 0x3E;
	}

	if (JoystickChanges & JOY_DOWN)
	{
		MIDICommand = ((JoystickStatus & JOY_DOWN)? MIDI_COMMAND_NOTE_ON : MIDI_COMMAND_NOTE_OFF);
		MIDIPitch   = 0x3F;
	}

	if (JoystickChanges & JOY_PRESS)
	{
		MIDICommand = ((JoystickStatus & JOY_PRESS)? MIDI_COMMAND_NOTE_ON : MIDI_COMMAND_NOTE_OFF);
		MIDIPitch   = 0x3B;
	}

	if (MIDICommand)
	{
		MIDI_EventPacket_t MIDIEvent = (MIDI_EventPacket_t)
			{
				.Event       = MIDI_EVENT(0, MIDICommand),

				.Data1       = MIDICommand | Channel,
				.Data2       = MIDIPitch,
				.Data3       = MIDI_STANDARD_VELOCITY,
			};

		MIDI_Device_SendEventPacket(&Keyboard_MIDI_Interface, &MIDIEvent);
		MIDI_Device_Flush(&Keyboard_MIDI_Interface);
	}

	PrevJoystickS</code></pre></td></tr></table>
</div> <!-- class=content -->
<div class='footer'>generated by <a href='https://git.zx2c4.com/cgit/about/'>cgit v1.2.3</a> (<a href='https://git-scm.com/'>git 2.25.1</a>) at 2025-11-25 20:31:12 +0000</div>
</div> <!-- id=cgit -->
</body>
</html>
_SetAllLEDs(LEDMASK_USB_NOTREADY);
}

/** Event handler for the library USB Configuration Changed event. */
void EVENT_USB_Device_ConfigurationChanged(void)
{
	bool ConfigSuccess = true;

	ConfigSuccess &= MIDI_Device_ConfigureEndpoints(&Keyboard_MIDI_Interface);

	LEDs_SetAllLEDs(ConfigSuccess ? LEDMASK_USB_READY : LEDMASK_USB_ERROR);
}

/** Event handler for the library USB Control Request reception event. */
void EVENT_USB_Device_ControlRequest(void)
{
	MIDI_Device_ProcessControlRequest(&Keyboard_MIDI_Interface);
}

