From e838aa1860b269012c361118fc98038c17f0e6c9 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Ferenc=20so=C3=B3s?= <eluch@different.hu>
Date: Mon, 20 Jan 2020 09:59:38 +0100
Subject: Fix wording for ssl_insecure option on mitmweb

---
 web/src/js/components/Header/OptionMenu.jsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'web/src/js/components/Header/OptionMenu.jsx')

diff --git a/web/src/js/components/Header/OptionMenu.jsx b/web/src/js/components/Header/OptionMenu.jsx
index 765129ed..4eb319ec 100644
--- a/web/src/js/components/Header/OptionMenu.jsx
+++ b/web/src/js/components/Header/OptionMenu.jsx
@@ -31,7 +31,7 @@ function OptionMenu({ openOptions }) {
                             Use host header for display
                         </SettingsToggle>
                         <SettingsToggle setting="ssl_insecure">
-                            Verify server certificates
+                            Don't verify server certificates
                         </SettingsToggle>
                     </div>
                     <div className="menu-legend">Quick Options</div>
-- 
cgit v1.2.3

