From c8b6c6150b36b87b7159fabeed339b42835c6290 Mon Sep 17 00:00:00 2001
From: Maximilian Hils <git@maximilianhils.com>
Date: Thu, 12 Dec 2019 16:28:22 +0100
Subject: [web] fix status column rendering

---
 web/src/js/components/FlowTable/FlowColumns.jsx | 10 +++++-----
 1 file changed, 5 insertions(+), 5 deletions(-)

(limited to 'web/src/js/components/FlowTable/FlowColumns.jsx')

diff --git a/web/src/js/components/FlowTable/FlowColumns.jsx b/web/src/js/components/FlowTable/FlowColumns.jsx
index 07b54a32..64b8ac82 100644
--- a/web/src/js/components/FlowTable/FlowColumns.jsx
+++ b/web/src/js/components/FlowTable/FlowColumns.jsx
@@ -92,19 +92,19 @@ MethodColumn.headerName = 'Method'
 export function StatusColumn({ flow }) {
     let color = 'darkred';
 
-    if (flow.response !== null && 100 <= flow.response.status_code && flow.response.status_code < 200) {
+    if (flow.response && 100 <= flow.response.status_code && flow.response.status_code < 200) {
         color = 'green'
     }
-    else if (flow.response !== null && 200 <= flow.response.status_code && flow.response.status_code < 300) {
+    else if (flow.response && 200 <= flow.response.status_code && flow.response.status_code < 300) {
         color = 'darkgreen'
     }
-    else if (flow.response !== null && 300 <= flow.response.status_code && flow.response.status_code < 400) {
+    else if (flow.response && 300 <= flow.response.status_code && flow.response.status_code < 400) {
         color = 'lightblue'
     }
-    else if (flow.response !== null && 400 <= flow.response.status_code && flow.response.status_code < 500) {
+    else if (flow.response && 400 <= flow.response.status_code && flow.response.status_code < 500) {
         color = 'lightred'
     }
-    else if (flow.response !== null && 500 <= flow.response.status_code && flow.response.status_code < 600) {
+    else if (flow.response && 500 <= flow.response.status_code && flow.response.status_code < 600) {
         color = 'lightred'
     }
 
-- 
cgit v1.2.3

