From 9d514330cad64e589987b5e539809ae95d14e137 Mon Sep 17 00:00:00 2001
From: Maximilian Hils <git@maximilianhils.com>
Date: Thu, 26 Oct 2017 16:34:24 +0200
Subject: [web] adjust tests

---
 web/src/js/components/FlowTable.jsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'web/src/js/components/FlowTable.jsx')

diff --git a/web/src/js/components/FlowTable.jsx b/web/src/js/components/FlowTable.jsx
index e3e3d505..a6381d0d 100644
--- a/web/src/js/components/FlowTable.jsx
+++ b/web/src/js/components/FlowTable.jsx
@@ -121,7 +121,7 @@ class FlowTable extends React.Component {
     }
 }
 
-FlowTable = AutoScroll(FlowTable)
+export const PureFlowTable = AutoScroll(FlowTable)
 
 export default connect(
     state => ({
@@ -132,4 +132,4 @@ export default connect(
     {
         selectFlow: flowsActions.select,
     }
-)(FlowTable)
+)(PureFlowTable)
-- 
cgit v1.2.3

